ARCHER | Authorities
author: American Numismatic Society

Robinson, E. S. G. (Edward Stanley Gotch)
birth: 1887
death: 1976
Edward Stanley Gotch Robinson (1887-1976) was a numismatist, specializing in Greek and Roman coins, and Keeper of the Department of Coins and Medals at the British Museum.