ARCHER | Authorities
author: American Numismatic Society

Riemann, Othon, 1853-1891
birth: June 13, 1853
death: August 16, 1891
Othon Riemann (13 June 1853, in Nancy – 16 August 1891, in Interlaken) was a French classical philologist and archaeologist.