ARCHER | Authorities
author: American Numismatic Society

Pietz, Adam, 1873-1961
birth: 1873
death: 1961
Adam Pietz (1873-1961) was a sculptor, medalist engraver, and etcher.
Adam Pietz (1873-1961) was a sculptor, medalist engraver, and etcher. He was born in Offenbach, Germany, and moved to the U.S. in 1889 where he studied at the Chicago Art Institute (1892-1893), Drexel Institute (1894-1898), and the Pennsylvania Academy of the Fine Arts (1899-1903). By 1897 he was an established engraver and die sinker operating out of a private studio on Chestnut Street in Philadelphia. He also served as assistant chief engraver at the Philadelphia Mint from 1927 to 1946. In 1917 he designed a World War I good luck medal for the United States. This So-Called Dollar is remembered for having a swastika, an ancient good-luck symbol, on its obverse. He designed the American Numismatic Association’s Medal of Merit. His only coin design to be minted was the Iowa Statehood Centennial Commemorative Half Dollar (1946). After retiring, he continued his work on medals for the Treasury Department, producing designs that included the Meritorious Service Award Medal (1949), Alexander Hamilton Medal (reverse, 1955), and the Distinguished Service Award (bestowed after his death, 1963).
1873Born, Offenbach (Germany).
1889Moved to United States
1897Began private engraving business, Philadelphia (Pa.).