ARCHER | Authorities
author: American Numismatic Society

Hamilton, George L., d. 1950
birth: Uncertain
death: 1950
Coin collector Colonel George L. Hamilton (d. 1950) of Jamestown, Rhode Island, and Santa Barbara, California, became a member of the American Numismatic Society in 1916.