ARCHER | Authorities
author: American Numismatic Society

Fuld, George J., (George Joseph), 1932-2013
birth: 1932
death: 2013
George J. Fuld (1932-2013) of Owings Mills, Maryland, was born in Baltimore, graduated from the Massachusetts Institute of Technology with an Sc.D. in 1957, and was a consultant and vice president of Fuld Brothers (1954-1960) before working as a radiation researcher with Goodyear Tire (1963-1967).
George J. Fuld (1932-2013) of Owings Mills, Maryland, was born in Baltimore, graduated from the Massachusetts Institute of Technology with an Sc.D. in 1957, and was a consultant and vice president of Fuld Brothers (1954-1960) before working as a radiation researcher with Goodyear Tire (1963-1967). He married his wife Doris in 1955 and with her owned Dorge Approvals, a philatelic auction business that conducted sales during the 1970s. He served as editor of The TAMS Journal, published by the Token and Medal Society, became auction manager for Bowers and Ruddy in 1980, and was later vice president and director of auctions at Pacific Coast Auction Galleries of Santa Barbara, California. He wrote extensively on medals and tokens, and with his father Melvin coauthored numerous articles and other works on Civil War tokens. He is also known for having established a token rarity scale.
1932Born, Baltimore (Md.).
1957Graduated from the Massachusetts Institute of Technology , Cambridge (Mass.).