ARCHER | Authorities
author: American Numismatic Society

Evans, Arthur, Sir, 1851-1941.
birth: July 8, 1851
death: July 11, 1941
Sir Arthur John Evans (8 July 1851 – 11 July 1941) was an English archaeologist and pioneer in the study of Aegean civilization in the Bronze Age. He is most famous for unearthing the palace of Knossos on the Greek island of Crete.