ARCHER | Authorities
author: American Numismatic Society

Brenner, Victor D. (Victor David), 1871-1924
birth: June 12, 1871
death: April 05, 1924
Victor David Brenner (1871-1924) was an artist, sculptor, and engraver who is most widely known for his design of the U.S. Lincoln cent in 1909.
June 12, 1871Born, Šiauliai (Lithuania).
1890Emigrated to the United States, New York (N.Y.).
1909Designed U.S. Lincoln cent