ARCHER | Authorities
author: American Numismatic Society

Anderson, P.K. (Paul Kenneth), 1894-1968
birth: 1894
death: 1968
P.K. (Paul Kenneth) Anderson (1894-1968) of Goteborg, Oklahoma, was an engineer and numismatist who published articles (circa 1930s-1960s), mostly on Spanish coins, in The Numismatist, the monthly magazine of the American Numismatic Association (ANA), and other publications. He served on the board of governors (1955-1961) and as president (1963-1965) of the ANA. His collection of Spanish coins was bequeathed to the American Numismatic Society.