ARCHER | Authorities
author: American Numismatic Society

Seyrig, Henri
birth: November 10, 1895
death: January 21, 1973
Henri Arnold Seyrig (10 November 1895 – 21 January 1973) was a French archaeologist, numismatist, and historian of antiquities. He was general director of antiquities of Syria and Lebanon since 1929 and director during more than twenty years of the Institute of archaeology of Beirut.