ARCHER | Authorities
author: American Numismatic Society

Raymond, Wayte
birth: 1886
death: 1956
Wayte Raymond (1886–1956) was a numismatist from the United States. He authored several numismatic books and catalogs and his Standard Catalog was considered the premier coin guide of its time. He was inducted into the Numismatic Hall of Fame in 1969.